-- Schema: C6MartPeriodico
-- Stored Procedure: PL_D_S158PiramideModello

-- =============================================
-- Author:		Paolo Giovanetti
-- Create date: <Create Date,,>
-- Description:	<Description,,>
-- =============================================
-- [C6MartPeriodico].[PL_D_S158PiramideModello] 'F','CLRLCU75R04B573X'
CREATE procedure [C6MartPeriodico].[PL_D_S158PiramideModello] 
	@Rete char(1), 
	@CodiceFiscale varchar(16)
AS
BEGIN

		SELECT BF.NOME_PROGETTO AS NomePrg,
			   PIRMOD.ORIZZ_TEMP AS OrizzTempPrg,
			   AGGR.VAR_PERC_PTF as VarPrg,
			   SUM(BF.CTV)AS ControvalorePrg
		FROM  C6MartPeriodico.PATRIMONIO_BF BF 
		INNER JOIN C6MartPeriodico.RISCHIO_AGGREGATO AGGR
			ON BF.RETE= AGGR.RETE
			AND BF.COD_FISCALE= AGGR.COD_FISCALE
			AND AGGR.COD_AGGREG = 'RISFIN|PIRAMIDE|' + LEFT(BF.ID_AREA,3) + '|' + BF.NOME_PROGETTO
		INNER JOIN C6MartPeriodico.PIRAMIDE_MOD PIRMOD
			ON BF.RETE= PIRMOD.RETE
			AND BF.COD_FISCALE= PIRMOD.COD_FISCALE
			AND BF.ID_AREA = PIRMOD.ID_AREA
			AND BF.NOME_PROGETTO = PIRMOD.NOME_PROGETTO
		WHERE 1=1
		AND BF.ID_AREA = 'inv'
		AND BF.RETE = @Rete
		AND BF.COD_FISCALE = @CodiceFiscale
		AND BF.CTV > 0
		group BY BF.NOME_PROGETTO,PIRMOD.ORIZZ_TEMP,AGGR.VAR_PERC_PTF
		
 


	--SELECT
	--	AREA_BISOGNO.ID_AREA AS Need_Breve,					-- NOME BREVE DELL'AREA DI BISOGNO
	--	PIRMOD.NOME_PROGETTO AS Nome_Progetto,			    -- NOME DEL PROGETTO (AREA INV)
	--	ISNULL(PIRMOD.PERC_AREA,0) AS Perc_Need,			-- PERCENTUALE DI ALLOCAZIONE SULL'AREA DI BISOGNO
	--	PIRMOD.ORIZZ_TEMP AS Orizz_Temp,					-- ORIZZONTE TEMPORALE DEL PROGETTO
 --       PIRMOD.CTV_PROGETTO AS Controvalore,				-- Controvalore Progetto
	--	SUM(ISNULL(PIRMOD.PERC_AREA,0)) OVER (PARTITION BY PIRMOD.RETE, PIRMOD.COD_FISCALE, AREA_BISOGNO.ID_AREA) AS Totale_Percentuale,	-- PERCENTUALE DI ALLOCAZIONE DEI PROGETTI
	--	SUM(ISNULL(PIRMOD.PERC_AREA,0)) OVER (PARTITION BY PIRMOD.RETE, PIRMOD.COD_FISCALE) AS Totale,
	--	COUNT(CASE WHEN AREA_BISOGNO.ID_AREA = 'INV' AND PIRMOD.NOME_PROGETTO IS NOT NULL THEN 1 ELSE NULL END) OVER (PARTITION BY PIRMOD.RETE, PIRMOD.COD_FISCALE) AS NumeroProgettiInv,
	--	AREA_BISOGNO.ORDINAMENTO AS Ordinamento
	--FROM C6MartPeriodico.AREA_BISOGNO
	--LEFT JOIN  C6MartPeriodico.PIRAMIDE_MOD  PIRMOD
	--	ON PIRMOD.ID_AREA = AREA_BISOGNO.ID_AREA
	--	AND((PIRMOD.ID_AREA = 'INV' AND PIRMOD.NOME_PROGETTO IS NOT NULL )--OR PIRAMIDE_MOD.tipo_progetto<>'Default'
	--		OR PIRMOD.ID_AREA IN ('RIS','EXT','LIQ','PRE'))
	--	AND PIRMOD.RETE = @Rete
	--	AND PIRMOD.COD_FISCALE = @CodiceFiscale
	--WHERE AREA_BISOGNO.ORDINAMENTO < 6	
	--ORDER BY AREA_BISOGNO.ORDINAMENTO

END
 


