﻿CREATE TABLE [dbo].[sysdiagrams] (
	[name] sysname NOT NULL,
	[principal_id] int NOT NULL,
	[diagram_id] int NOT NULL IDENTITY(1,1),
	[version] int NULL,
	[definition] varbinary NULL
)
ALTER TABLE [dbo].[sysdiagrams] ADD CONSTRAINT [PK__sysdiagrams__4D94879B] PRIMARY KEY CLUSTERED ([diagram_id])
GO